J08499+5108

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 1.6832E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

08 49 57.9855 57.985057.984557.984057.983557.983057.982557.9820

51 08 29.015

29.010

29.005

29.000

28.995

28.990

28.985

28.980

Pol line 1 milli arcsec = 1.0000E-02 RATIO