J08546+5757

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 6.5312E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

08 54 41.9995 41.9985 41.9975 41.9965 41.9955

57 57 29.945

29.940

29.935

29.930

29.925

29.920

29.915

29.910

Pol line 1 milli arcsec = 1.0000E-02 RATIO