J15457+5400

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 1.9234E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

15 45 43.830543.830043.829543.829043.828543.828043.827543.827043.8265

54 00 42.780

42.775

42.770

42.765

42.760

42.755

42.750

42.745

Pol line 1 milli arcsec = 1.0000E-02 RATIO