J16469+4059

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 2.0732E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

16 46 56.8620 56.8615 56.8610 56.8605 56.8600 56.8595 56.8590

40 59 17.185

17.180

17.175

17.170

17.165

17.160

17.155

17.150

Pol line 1 milli arcsec = 1.0000E-02 RATIO