J16529+3902

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 3.3518E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

16 52 58.5110 58.5105 58.5100 58.5095 58.5090 58.5085 58.5080

39 02 49.825

49.820

49.815

49.810

49.805

49.800

49.795

49.790

Pol line 1 milli arcsec = 1.0000E-02 RATIO