0859+470

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 5.0349E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

09 03 03.9925 03.9915 03.9905 03.9895 03.9885

46 51 04.165

04.160

04.155

04.150

04.145

04.140

04.135

04.130

04.125

04.120

Pol line 1 milli arcsec = 2.0000E-02 RATIO