1543+517

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 2.1263E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

15 45 02.8240 02.8235 02.8230 02.8225 02.8220 02.8215 02.8210 02.8205

51 35 00.880

00.875

00.870

00.865

00.860

00.855

00.850

00.845

Pol line 1 milli arcsec = 4.0000E-02 RATIO