1646+411

Levs = 8.000E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512, 1024) Peak contour flux = 2.9437E-01 Jy/beam

Declination (J2000)

Right Ascension (J2000)

16 48 29.2635 29.2630 29.2625 29.2620 29.2615 29.2610 29.2605

41 04 05.575

05.570

05.565

05.560

05.555

05.550

05.545

05.540

Pol line 1 milli arcsec = 1.0000E-02 RATIO